CSCI 355 Laboratory Pin-Out Sheet

STUDENT NAME Page_______Of_______ EXPERIMENT NUMBER IC NUMBER IC INSTANCE NAME

Source Destination Pin Number VHDL Alias Name Pin Number VHDL Alias Name